1766627361207
888,0.64.8
13130,0.64.8
18427,0.64.8
619,0.64.8
9180,0.64.8
5663,0.64.8
7996,0.64.8
6240,0.64.8
5767,0.64.8
13527,0.64.8
17654,0.64.8
