1766368163417
888,0.64.8
13121,0.64.8
18412,0.64.8
620,0.64.8
9174,0.64.8
5661,0.64.8
7990,0.64.8
6237,0.64.8
5765,0.64.8
13519,0.64.8
17639,0.64.8
